---
id: indicator
title: SenseCAP Indicator
sidebar_label: SenseCAP Indicator
sidebar_position: 3
---

A 4-inch touchscreen device, powered by dual MCUs, the ESP32 and RP2040, and supports Wi-Fi, BLE, and LoRa®.

### Specifications

- **MCU**
  - ESP32S3 (WiFi & Bluetooth) + RP2040
- **LoRa Transceiver**
  - Semtech SX1262
- **Frequency options**
  - 862-930 MHz
- **Connectors**
  - 2 USB type-C port
  - 2 Grove Connectors: GPS, and 400+ Grove Sensors
  - Antenna Female connector

### Features

- **Screen**: 3.95 Inch, Capacitive RGB Touch Screen.
- **2 Grove Connectors**: 400+ Grove-compatible GPIOs for flexible expansion options.

### Resources

- Purchase Links:
  - International
    - [Seeed Studio Online Store](https://www.seeedstudio.com/SenseCAP-Indicator-D1L-for-Meshtastic-p-6304.html)
- [User Guide](https://wiki.seeedstudio.com/sensecap_indicator_meshtastic/)

#### Images

![SenseCAP Indicator for Meshtastic](/img/hardware/seeed/indicator.webp)
![SenseCAP Indicator Hardware Overview](/img/hardware/seeed/indicator-hardware.webp)
