Modules are included in the firmware and allow users to extend the functionality of their mesh or device.

The list of current modules is as follows:

- Canned Message Module
- External Notification Module
- Input Broker Module
- Range Test Module
- Serial Module
- Store and Forward Module
- Telemetry Module

:::tip
Once module settings are changed, a **reset** is required for them to take effect.
:::
