---
id: ota
title: nRF52 OTA Firmware Updates
sidebar_label: Over-The-Air
sidebar_position: 2
description: Instructions for using the Over-The-Air(OTA) method to flash Meshtastic firmware to nRF52 chipset devices.
---

import Tabs from "@theme/Tabs";
import TabItem from "@theme/TabItem";
import { Icon } from "@iconify/react";

nRF52 devices from RAK are able to accept OTA firmware updates from a mobile device over bluetooth. Older T-Echo bootloaders do not have OTA support.

:::caution

OTA firmware updates come with an increased risk of failure. If the update process fails, your device will be left in a non-working state and require physical access for intervention.

:::

<Tabs
  groupId="settings"
  defaultValue="apple"
  values={[
    {
      label: (
        <>
          <Icon icon="mdi:android" height="1.5rem" style={{ marginRight: "0.25rem" }} /> Android
        </>
      ),
      value: "android",
    },
    {
      label: (
        <>
          <Icon icon="mdi:apple" height="1.5rem" style={{ marginRight: "0.25rem" }} /> Apple
        </>
      ),
      value: "apple",
    },
  ]}>

<TabItem value="android">

#### Android

:::info
As of this writing, the current Android release of the nRF DFU app (v2.3.0) is not compatible with Meshtastic firmware updates. Please use the instructions below for updating via OTA with the nRF Connect App.
:::

OTA firmware updates are available for Android using an older release of the more advanced nRF Connect App **version 4.24.3** which is available for download from the [Nordic Semiconductor GitHub page](https://github.com/NordicSemiconductor/Android-nRF-Connect/releases/tag/v4.24.3).

1. Download the firmware release you wish to install from the [Meshtastic Download Page](/downloads) or [Meshtastic GitHub](https://github.com/meshtastic/firmware/releases).
2. Unzip the firmware folder
3. Open the nRF Connect App and select CONNECT on your device from the SCANNER tab
4. If the top right corner of the interface that is shown says DISCONNECT, proceed to step 5, if it says CONNECT, select CONNECT
5. Select the DFU icon from the top-right of the screen
6. Select OK after verifying that "Distribution Packet (ZIP)" is selected
7. Select the correct device firmware file (will end with -ota.zip)
8. The update will start automatically (this will be slow)
9. Once the update is complete, the device will reboot automatically

</TabItem>

<TabItem value="apple">

#### Apple

OTA firmware updates are available on iOS & iPadOS using the nRF Device Firmware Update App available through the [Apple App Store](https://apps.apple.com/us/app/nrf-device-firmware-update/id1624454660)

1. Download the firmware release you wish to install from the [Meshtastic Download Page](/downloads), [Meshtastic GitHub](https://github.com/meshtastic/firmware/releases), or via the iOS or iPadOS app.
2. Unzip the firmware folder
3. Open the nRF DFU App and select the correct device firmware file (will end with -ota.zip)
4. Connect to your device
5. Upload the firmware

</TabItem>
</Tabs>
