---
id: neighbor-info
title: Neighbor Info Module Usage
slug: /settings/moduleconfig/neighbor-info
sidebar_label: Neighbor Info
---

import Tabs from "@theme/Tabs";
import TabItem from "@theme/TabItem";

The Neighbor Info Module is for sending information on each node's 0-hop neighbors to the mesh. Config options are: Enabled and Update Interval. 

In order to use it, make sure your devices use firmware version 2.2.0 or higher.

## Neighbor Info Module Config Values

### Enabled

Enables the Neighbor Info Module.

### Update Interval

How often the neighbor info is sent to the mesh.


## Neighbor Info Module Client Availability

<Tabs
groupId="settings"
defaultValue="cli"
values={[
{label: 'Android', value: 'android'},
{label: 'Apple', value: 'apple'},
{label: 'CLI', value: 'cli'},
{label: 'Web', value: 'web'},
]}>
<TabItem value="android">


:::info
All Neighbor Info Module config options are available for Android in app version 2.2.0 and higher.

1. Open the Meshtastic App
2. Navigate to: **Vertical Ellipsis (3 dots top right) > Radio Configuration > Neighbor Info**
:::

</TabItem>
<TabItem value="apple">

Not yet implemented.

</TabItem>
<TabItem value="cli">

:::info

All Neighbor Info Module config options are available in the python CLI version 2.2.0 and higher.

:::

Example commands are below:

```shell title="Enable/Disable the Neighbor Info Module"
meshtastic --set neighbor_info.enabled true
meshtastic --set neighbor_info.enabled false
```

```shell title="Set the update interval to 10 minutes"
meshtastic --set neighbor_info.update_interval 600
```

```shell title="Get the Neighbor Info Module Configuration"
meshtastic --get neighbor_info
```


</TabItem>
<TabItem value="web">

Not yet implemented.

</TabItem>
</Tabs>
