---
id: display
title: Display Configuration
slug: /settings/config/display
sidebar_label: Display
---

import Tabs from "@theme/Tabs";
import TabItem from "@theme/TabItem";

The display config options are: Screen On Duration, Auto Carousel Interval, Always Point North and GPS Format. Display config uses an admin message sending a `Config.Display` protobuf.

## Device Config Values

### Screen On Duration

How long the screen remains on after the user button is pressed or messages are received.

### Auto Carousel Interval

Automatically toggles to the next page on the screen like a carousel, based the specified interval.

### Always Point North

If this is set, the compass heading on the screen outside of the circle will always point north. This feature is off by default and the top of display represents your heading direction, the North indicator will move around the circle.

### GPS Format

The format used to display GPS coordinates on the device screen.

Acceptable values:

| Value  |           Description           |
| :----: | :-----------------------------: |
| `DEC`  |         Decimal Degrees         |
| `DMS`  |     Degrees Minutes Seconds     |
| `UTM`  |  Universal Transverse Mercator  |
| `MGRS` | Military Grid Reference System  |
| `OLC`  | Open Location Code (Plus Codes) |
| `OSGR` | Ordnance Survey Grid Reference  |

### Prefered display units

switch between `METRIC` (default) and `IMPERIAL` units

### Flip Screen

If enabled, the screen will be rotated 180 degrees, for cases that mount the screen upside down

### OLED Defintion

The type of OLED Controller is auto-detected by default, but can be defined with this setting if the auto-detection fails.

Acceptable values:

|     Value      |          Description           |
| :------------: | :----------------------------: |
|  `OLED_AUTO`   | Auto detect display controller |
| `OLED_SSD1306` |   Always use SSD1306 driver    |
| `OLED_SH1106`  |    Always use SH1106 driver    |

## Device Config Client Availability

<Tabs
groupId="settings"
defaultValue="apple"
values={[
{label: 'Android', value: 'android'},
{label: 'Apple', value: 'apple'},
{label: 'CLI', value: 'cli'},
{label: 'Web', value: 'web'},
]}>
<TabItem value="android">

:::info

Display Config is available for Android.

1. Open the Meshtastic App
2. Navigate to: **Vertical Ellipsis (3 dots top right) > Device Settings > Display Config**

:::

</TabItem>
<TabItem value="apple">

:::info
All display config options are available on iOS, iPadOS and macOS at Settings > Radio Configuration > Display.
:::

</TabItem>
<TabItem value="cli">

:::info

All display config options are available in the python CLI. Example commands are below:

:::

| Setting                           | Acceptable Values                          | Default                      |
| --------------------------------- | ------------------------------------------ | ---------------------------- |
| display.auto_screen_carousel_secs | `integer`                                  | Default of `0` is 10 minutes |
| display.compass_north_top         | `false`, `true`                            | `false`                      |
| display.flip_screen               | `fasle`, `true`                            | `false`                      |
| display.gps_format                | `DEC`, `DMS`, `UTM`, `MGRS`, `OLC`, `OSGR` | `DEC`                        |
| display.oled                      | `OLED_AUTO`, `OLED_SSD1306`, `OLED_SH1106` | `OLED_AUTO`                  |
| display.screen_on_secs            | `integer`                                  | Default of `0` is off.       |
| display.units                     | `METRIC`, `IMPERIAL`                       | `METRIC`                     |

:::tip

Because the device will reboot after each command is sent via CLI, it is recommended when setting multiple values in a config section that commands be chained together as one.

```shell title="Example:"
meshtastic --set display.screen_on_secs 120 --set display.gps_format UTM
```

:::

```shell title="Set Screen On Duration (Default of 0 is 10 minutes)"
meshtastic --set display.screen_on_secs 0
meshtastic --set display.screen_on_secs 120
```

```shell title="Set Auto Carousel Interval (Default of 0 is Off)"
meshtastic --set display.auto_screen_carousel_secs 0
// Set to 2 Minutes (120 Seconds)
meshtastic --set display.auto_screen_carousel_secs 120
```

```shell title="Specify GPS format on device screen"
meshtastic --set display.gps_format UTM
```

</TabItem>
<TabItem value="web">

:::info
All display config options are available in the Web UI.
:::

  </TabItem>
</Tabs>
