---
title: Initial Configuration
sidebar_label: Initial Configuration
slug: /getting-started/initial-config
sidebar_position: 4
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';
import LoRaRegions from '../blocks/_lora-regions.mdx';


## Connection Supported Clients

Depending on your connection, some configuration options are not fully supported. Find out which Client is best for your type of connection.

<Tabs
groupId="settings"
defaultValue="serial"
values={[
{label: 'Serial', value: 'serial'},
{label: 'Bluetooth', value: 'ble'},
{label: 'Network', value: 'network'},
]}>
<TabItem value="serial">

- [Python CLI](/docs/software/python/cli/)
- [Web Client](https://client.meshtastic.org)


</TabItem>
<TabItem value="ble">

- [Web Client](https://client.meshtastic.org)


</TabItem>
<TabItem value="network">

- [Web Client](https://client.meshtastic.org)


</TabItem>
</Tabs>


### Configure Regional Settings

<LoRaRegions />



<Tabs
groupId="settings"
defaultValue="apple"
values={[
{label: 'Android', value: 'android'},
{label: 'Apple', value: 'apple'},
{label: 'CLI', value: 'cli'},
{label: 'Flasher', value: 'flasher'},
{label: 'Web', value: 'web'},
]}>
<TabItem value="android">

:::info
Region and Modem Preset can be configured on Android.
:::

</TabItem>
<TabItem value="apple">

:::info
Configuration of Region, Modem Preset and Hop Limit is available on iOS, iPadOS and macOS at Settings > Radio Configuration > LoRa.
:::

</TabItem>
<TabItem value="cli">

```sh
meshtastic --set lora.region <REGION CODE>
```

</TabItem>
<TabItem value="flasher">

:::info
No LoRa config options are available in the Flasher.
:::

  </TabItem>
  <TabItem value="web">

:::info
All LoRa config options are available in the Web UI.
:::

  </TabItem>
</Tabs>





