---
id: station-g1
title: Station G1 device
sidebar_label: Station G1
sidebar_position: 3
---

The Station G1 is the first dedicated hardware to be designed from scratch purely for Meshtastic Licensed (HAM) Operation by Neil Hao. It has been designed to be small and compact with the inclusion of 35dBm high power PA.

Only the US 915 Mhz version is available currently. There should be an EU 433 Mhz version available in the future.

### Features

- Meshtastic pre-installed
- ESP32 WROOM microprocessor - WiFi & Bluetooth
- Semtech SX1262  - LoRa Transceiver
- Frequency options:
  - 915 Mhz
- Additional 35dBm Lora Power Amplifier to boost the transmit power
- User button
- 1.3 inch OLED screen
- Optional GPS Module and IO Extension Socket
- Optional 12V Battery Docker which can be used as Backup Power, or in scenarios that require mobility

### Resources

- Firmware file: `firmware-station-g1-1.x.x.bin`
- [Purchase link](https://www.tindie.com/products/neilhao/meshtastic-mesh-device-station-edition/)

[<img alt="Station G1" src="https://uniteng.com/wiki/lib/exe/fetch.php?media=meshtastic:meshtastic_mesh_device_station_edition_overview.jpg" style={{zoom:'25%'}} />](https://uniteng.com/wiki/lib/exe/fetch.php?media=meshtastic:meshtastic_mesh_device_station_edition_overview.jpg)

Further information on the Station G1 can be found on [Unit Engineering's Wiki](https://uniteng.com/wiki/doku.php?id=meshtastic:station).