---
id: flashing-nrf52
title: Drag & Drop  NRF52 Firmware Updates
sidebar_label: Drag & Drop - NRF52
pagination_prev: getting-started/flashing-firmware/flashing-firmware
pagination_next: getting-started/flashing-firmware/flashing-esp32
sidebar_position: 1
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';


The NRF52 based devices (LilyGO T-Echo, RAK Wisblock 4631) have the easiest firmware upgrade process. (No driver or software install is required on any platform)  

Connect your device to your computer with a data USB cable. Double click the reset button on your device, this will put it into bootloader mode and and a drive will appear on Windows, Mac and Linux.

A new drive will be mounted on your computer. Open this drive and you should see three files: `CURRENT.UF2`, `INDEX.HTM`, and `INFO_UF2.TXT`

Drop the appropriate appropriate `firmware-xxxxx-1.3.x.uf2` file from the release you want to install onto this drive and the meshtastic firmware will be installed on the device. Once the file has finished copying onto the drive the device will reboot and load Meshtastic.

