---
id: 1.2_EOL
title: Version 1.2 End of life (EOL)
sidebar_label: 1.2 End of life (EOL)
sidebar_position: 20
---

Meshtastic 1.2 was a beta version that has been superceded by 1.3. Version 1.2 is fundamentally incompatible with any 1.3 versions of device firmware, flashing utilities, or client applications.

- Last 1.2 Python api version install: pip install meshtastic==1.2.95
- Final 1.2 Meshtastic Flasher install: pip install meshtastic-flasher==1.0.106 (Do not attempt to install 1.3.x firmware with this release)
- [Final 1.2 Device Firmware](https://github.com/meshtastic/firmware/releases/tag/v1.2.65.0adc5ce)
- [Final 1.2 Android App](https://github.com/meshtastic/Meshtastic-Android/releases/tag/1.2.67)
