---
id: lora
title: LoRa Configuration
slug: /settings/config/lora
sidebar_label: LoRa
---

import Tabs from "@theme/Tabs";
import TabItem from "@theme/TabItem";
import LoRaRegions from "../../blocks/_lora-regions.mdx";

The LoRa config options are: Region, Modem Preset, Max Hops, Transmit Power, Bandwidth, Spread Factor, Coding Rate, Frequency Offset, Transmit Enabled, Channel Number and Ignore Incoming Array. LoRa config uses an admin message sending a `Config.LoRa` protobuf.

:::note
In order to communicate fully, devices within a mesh must have identical settings for Region and Modem Preset, or identical custom Modem settings.
:::

## LoRa Config Values

:::note
You must set your device's `lora.region` setting. This will ensure that you are operating within the legal limits for your area.
:::

### Region

Sets the region for your node. Default is `unset`. As long as this is not set, the node screen will display a message and not transmit any packets.

<LoRaRegions />

### Modem Preset

Default is `unset` which equates to `LONG_FAST`. Presets are pre-defined modem settings (Bandwidth, Spread Factor, and Coding Rate) which influence both message speed and range. The default will provide a strong mixture of speed and range, for most users.

The presets are designed to provide further options for optimizing either speed (and reduced network congestion) or range, which can be useful for two real world scenarios:

1. A high number of devices exist in the mesh, or messages are sent very frequently. Faster speeds (and therefore lower radio time per device) can help with mesh network congestion.
2. Maximum range is desired, for long range scenarios where a several second delay in message receipt is acceptable (for instance, attempting to send messages from a town to a distant mountain top).

The Presets available are as follows, and follow a linear pattern of Fastest <--> Slowest, and Shortest <--> Longest range:

1. `SHORT_FAST` (Fastest, highest bandwidth, lowest airtime, shortest range)

2. `SHORT_SLOW`

3. `MEDIUM_FAST`

4. `MEDIUM_SLOW`

5. `LONG_FAST` (Default)

6. `LONG_MODERATE`

7. `LONG_SLOW`

8. `VERY_LONG_SLOW` (Slowest, lowest bandwidth, highest airtime, longest range)

### Max Hops

Maximum number of hops. This can't be greater than 7. Default is 3 which should be fine for most applications. _**Really, 3 is fine.**_

### Transmit Power

If zero then, use default max legal continuous power (i.e. something that won't burn out the radio hardware)

In most cases you should use zero here. Units are in dBm.

### Bandwidth

Bandwidth in MHz

Certain bandwidth numbers are 'special' and will be converted by the device firmware to the appropriate floating point value: 31 -> 31.25MHz

### Spread Factor

A number from 7 to 12. Indicates the number of chirps per symbol as 1<<spread_factor.

### Coding Rate

The denominator of the coding rate. ie for 4/5, the value is 5. 4/8 the value is 8.

### Frequency Offset

This parameter is for advanced users with advanced test equipment, we do not recommend most users use it.

A frequency offset that is added to to the calculated band center frequency. Used to correct for crystal calibration errors.

### Transmit Enabled

Allows you to enable and disable transmit (TX) from the LoRa radio. Useful for hot-swapping antennas and other tests.

Defaults to true

### Channel Number

This is controlling the actual hardware frequency the radio is transmitting on. A channel number between 1 and NUM_CHANNELS (whatever the max is in the current region). If this is ZERO/UNSET then the rule is "use the old channel name hash based algorithm to derive the channel number".

### Ignore Incoming Array

For testing it is useful sometimes to force a node to never listen to particular other nodes (simulating radio out of range). All nodenums listed in the ignore_incoming array will have packets they send dropped on receive (by router.cpp)

### Override Duty Cycle Limit

Setting this option to 'true' means the device will ignore the hourly duty cycle limit in Europe. This means that you might violate regulations if the device transmits too much. By default, this option is set to 'false,' which means the device will stop sending data when it reaches the hourly limit and will start again when it is allowed to do so.

## LoRa Config Client Availability

<Tabs
groupId="settings"
defaultValue="apple"
values={[
{label: 'Android', value: 'android'},
{label: 'Apple', value: 'apple'},
{label: 'CLI', value: 'cli'},
{label: 'Flasher', value: 'flasher'},
{label: 'Web', value: 'web'},
]}>
<TabItem value="android">

:::info

LoRa Config options such as Region, Modem Preset, and Hop Limit can be configured on Android.

1. Open the Meshtastic App
2. Navigate to: **Vertical Ellipsis (3 dots top right) > Device Settings > LoRa Config**

:::

</TabItem>
<TabItem value="apple">

:::info
Configuration of Region, Modem Preset and Hop Limit is available on iOS, iPadOS and macOS at Settings > Radio Configuration > LoRa.
:::

</TabItem>
<TabItem value="cli">

:::info

LoRa config commands are available in the python CLI. Example commands are below:

:::

|           Setting           |                                                      Acceptable Values                                                      |   Default   |
| :-------------------------: | :-------------------------------------------------------------------------------------------------------------------------: | :---------: |
|      lora.modem_preset      |            `LONG_FAST`, `LONG_SLOW`, `VERY_LONG_SLOW`, `MEDIUM_SLOW`, `MEDIUM_FAST`, `SHORT_SLOW`, `SHORT_FAST`             | `LONG_FAST` |
|       lora.use_preset       |                                                       `false`, `true`                                                       |   `false`   |
|         lora.region         | `UNSET`, `US`, `EU_433`, `EU_868`, `CN`, `JP`, `ANZ`, `KR`, `TW`, `RU` ,`IN`, `NZ_865`, `TH`, `LORA_24`, `UA_433`, `UA_868` |   `UNSET`   |
|       lora.bandwidth        |                                               `31`, `62`, `125`, `250`, `500`                                               |    `250`    |
|     lora.spread_factor      |                                               `7`, `8`, `9`, `10`, `11`, `12`                                               |    `12`     |
|      lora.coding_rate       |                                                     `5`, `6`, `7`, `8`                                                      |     `8`     |
|    lora.frequency_offset    |                                                      `0` to `1000000`                                                       |     `0`     |
|       lora.hop_limit        |                                                 `1`,`2`,`3`,`4`,`5`,`6`,`7`                                                 |     `3`     |
|        lora.tx_power        |                                                         `0` to `30`                                                         |     `0`     |
|       lora.tx_enabled       |                                                      `false`, `false`                                                       |   `true`    |
|        lora.channel         |                                                 `0`, `1` to `NUM_CHANNELS`                                                  |     `0`     |
|  lora.override_duty_cycle   |                                                       `false`, `true`                                                       |   `false`   |
| lora.sx126x_rx_boosted_gain |                                                       `false`, `true`                                                       |   `false`   |
|   lora.override_frequency   |              Any supported frequency the LoRA radio is capable of. Please respect local rules and regulations               |     `0`     |

:::tip

Because the device will reboot after each command is sent via CLI, it is recommended when setting multiple values in a config section that commands be chained together as one.

```shell title="Example:"
meshtastic --set lora.region US --set lora.modem_preset LONG_FAST
```

:::

```shell title="Set Modem Preset"
meshtastic --set lora.modem_preset LONG_FAST
meshtastic --set lora.modem_preset MEDIUM_FAST
```

```shell title="Set Region"
meshtastic --set lora.region US
meshtastic --set lora.region EU_433
```

```shell title="Set Hop Limit"

meshtastic --set lora.hop_limit 2
```

```shell title="Override Duty Cycle"
meshtastic --set lora.override_duty_cycle true
meshtastic --set lora.override_duty_cycle false
```

</TabItem>
<TabItem value="flasher">

:::info

Only `lora.region` can be set via the GUI flasher. Refer to other clients for any other config.

:::

</TabItem>
<TabItem value="web">

:::info
All LoRa config options are available in the Web UI.
:::

  </TabItem>
</Tabs>
