---
id: device
title: FAQs - Device
sidebar_label: Device
---

## Overview

### How do I turn off an ESP32 t-beam based device?

Hold down the left PWR button for about 10 seconds and the display should turn off.

### How do I turn on an ESP32 t-beam based device?

Push the left PWR button for about 1 second.
