---
id: integrations-telemetry-harbor
title: Telemetry Harbor Integration
sidebar_label: Telemetry Harbor
sidebar_position: 3
---

## Using Telemetry Harbor with Meshtastic

### How to Use

#### Prepare Your Meshtastic Device

1. Ensure your Meshtastic device is connected and operational.
2. Note the COM port associated with the device.

#### Set Up the Script

Clone this repository:

```sh
git clone https://github.com/TelemetryHarbor/harbor-meshtastic.git
cd harbor-meshtastic
```

Install required dependencies:

```sh
pip install -r requirements.txt
```

#### Run the Script

Execute the script and provide the required information:

- **Batch Endpoint**: Obtain this from your Telemetry Harbor account.
- **API Key**: Your unique key for secure communication.
- **COM Port**: The port your Meshtastic device is connected to.

```sh
python app.py
```

#### Stream Data

The script will push telemetry data from your device to the Telemetry Harbor batch endpoint.

#### Visualize in Grafana

1. Log in to your Telemetry Harbor Grafana instance.
2. Access pre-configured dashboards to view and analyze your Meshtastic data.

[Repository Link](https://github.com/TelemetryHarbor/harbor-meshtastic)
