---
id: buttons
title: LILYGO® TTGO Lora Hardware Buttons
sidebar_label: Buttons
sidebar_position: 1
---

## Functionality

- **Reset Button:**
  - **Single press:** Resets the device.
- **User/Program Button:**
  - **Long press:** Will signal the device to shutdown after 5 seconds.
  - **Single press:** Changes the information page displayed on the device's screen.
  - **Double press:** Sends an adhoc ping of the device's position to the network.
