---
id: lora
title: LoRa Configuration
sidebar_label: LoRa
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

The LoRa config options are: Region, Modem Preset, Max Hops, Transmit Power, Bandwidth, Spread Factor, Coding Rate, Frequency Offset, Transmit Disabled and Ignore Incoming Array.  LoRa config uses an admin message sending a `Config.LoRa` protobuf.

## LoRa Config Values

:::note
It is very important that you set your device's `lora_region` setting. This will ensure that you are operating within the legal limits for your area.
:::

### Region
Sets the region for your node. Default is `unset`.

|   Region Code   |                                                                  Description                                                                                                              |
| :-------: | :---------------------------------------------------------------------------------------: |
|  `unset`   | Unset |
| `us` | United States |
| `eu433` | European Union 433mhz |
| `eu868` | European Union 868mhz |
| `cn` | China |
| `jp` | Japan |
| `anz` | Australia & New Zealand |
| `kr` | Korea |
| `tw` | Taiwan |
| `ru` | Russia |
| `in` | India |
| `nz865` | New Zealand 865mhz |
| `th` | Thailand |


### Modem Preset

### Max Hops

### Transmit Power

If zero then, use default max legal continuous power (ie. something that won't burn out the radio hardware)

In most cases you should use zero here. Units are in dBm.

### Bandwidth

Bandwidth in MHz

Certain bandwidth numbers are 'special' and will be converted to the appropriate floating point value: 31 -> 31.25MHz

### Spread Factor 

A number from 7 to 12. Indicates the number of chirps per symbol as 1<<spread_factor.

### Coding Rate

The denominator of the coding rate. ie for 4/8, the value is 8. 5/8 the value is 5.

### Frequency Offset

This parameter is for advanced users with advanced test equipment, we do not recommend most users use it.

A frequency offset that is added to to the calculated band center frequency. Used to correct for crystal calibration errors.

### Transmit Disabled 

Disable transmit (TX) from the LoRa radio. Useful for hot-swapping antennas and other tests.

Defaults to false

### Ignore Incoming Array

For testing it is useful sometimes to force a node to never listen to particular other nodes (simulating radio out of range). All nodenums listed in the ignore_incoming array will have packets they send droped on receive (by router.cpp)

## LoRa Config Client Availability

<Tabs
groupId="settings"
defaultValue="apple"
values={[
{label: 'Android', value: 'android'},
{label: 'Apple', value: 'apple'},
{label: 'CLI', value: 'cli'},
{label: 'Flasher', value: 'flasher'},
{label: 'Web', value: 'web'},
]}>
<TabItem value="android">

:::info
Region and Modem Preset can be configured on Android.
:::

</TabItem>
<TabItem value="apple">

:::info
Configuration of Region, Modem Preset and Hop Limit is available on iOS, iPadOS and macOS at Settings > Radio Configuration > LoRa.
:::

</TabItem>
<TabItem value="cli">

LoRa config conmmands are available in the python CLI. Example commands are below:

|   Setting    |                               Acceptable Values                               |      Default      |
| :----------: | :---------------------------------------------------------------------------: | :---------------: |
| lora.modem_preset |   `longFast`, `longSlow`, `vlongSlow`, `medSlow`, `medFast`, `shortSlow`, `shortFast`       | `longFast` |
|    lora.region    |     `Unset`, `us`, `eu433`, `eu868`, `cn`, `jp`, `anz`, `kr`, `tw`, `ru` ,`in`, ` nz865`, `th`       |      `Unset`      |
| lora.hop_limit    |     `1`,`2`,`3`,`4`,`5`,`6`,`7`   |   `3`

</TabItem>
<TabItem value="flasher">

:::info
No lora config options are available in the Flasher.
:::

  </TabItem>
  <TabItem value="web">

:::info
All lora config options are available in the Web UI.
:::
    
  </TabItem>
</Tabs>