| Precision bits | Metric  |  Imperial  |
| :------------: | :-----: | :--------: |
|       10       | 23.3 km | 14.5 miles |
|       11       | 11.7 km | 7.3 miles  |
|       12       | 5.8 km  | 3.6 miles  |
|       13       | 2.9 km  | 1.8 miles  |
|       14       | 1.5 km  | 4787 feet  |
|       15       |  729 m  | 2392 feet  |
|       16       |  364 m  | 1194 feet  |
|       17       |  182 m  |  597 feet  |
|       18       |  91 m   |  299 feet  |
|       19       |  45 m   |  148 feet  |
