---
id: http-api
title: HTTP API
sidebar_label: HTTP API
---

:::info
Methods and types for using the device [HTTP API](http://example.com) are exported
:::

```typescript
import {
  Client,
  Types,
  Protobuf,
  SettingsManager,
} from '@meshtastic/meshtasticjs';

/**
 * Connection method
 */

const client = new Client();
SettingsManager.setDebugMode(Protobuf.LogLevelEnum.DEBUG);

const connection = client.createHTTPConnection();
connection.connect('192.168.x.x');

const restartDevice: Promise<void> = connection.restartDevice();
const getStatistics: Promise<void | Types.WebSPIFFSResponse> =
  connection.getStatistics();
const getNetworks: Promise<void | Types.WebNetworkResponse> =
  connection.getNetworks();
const getSPIFFS: Promise<void | Types.WebSPIFFSResponse> =
  connection.getSPIFFS();
const deleteSPIFFS: Promise<void | Types.WebSPIFFSResponse> =
  connection.deleteSPIFFS();
const blinkLED: Promise<void | any> = connection.blinkLED();
```
