| Metric  |  Imperial  |
| :-----: | :--------: |
| 23.3 km | 14.5 miles |
| 11.7 km | 7.3 miles  |
| 5.8 km  | 3.6 miles  |
| 2.9 km  | 1.8 miles  |
| 1.5 km  | 4787 feet  |
|  729 m  | 2392 feet  |
|  364 m  | 1194 feet  |
|  182 m  |  597 feet  |
|  91 m   |  299 feet  |
|  45 m   |  148 feet  |
