---
id: client-web
title: FAQs - Web
sidebar_label: Web
---

## Overview

### How do I access the network from my web browser?

Visit http://meshtastic.local (Note: This is a work in progress.)

### I've Flashed my device but I can't access the Web UI

Ensure you have used the included `device-install` script to flash your device, and that the file `spiffs-*.bin` is present in the same folder as your firmware at the time of flashing.

Note: Currently only Chrome and Chromium based browsers offer reliable support for the Web UI.
