---
id: linux
title: Linux Compatible Hardware
sidebar_label: Linux
sidebar_position: 7
---

This page is a place holder.

The device software can run on hardware that runs Linux to execute unit tests.

Fledgling support for a LoRa USB dongle has been in the works.

This page will be updated with more information as information is made available.

Please be mindful that a lot of this is incomplete, so please don't get too excited and asking for builds and/or timelines.
