---
id: enclosures
title: Enclosures
sidebar_label: Enclosures
sidebar_position: 3
---

import Tropho from "/img/enclosures/3dp-tropho-lora32.png";

## Created by tropho/TonyG

### TTGO LoRa32 v2.1.1.6 Case (will also fit the SX1280/v2.1.1.8 variety)

Download from [Printables](https://www.printables.com/model/131389-ttgo-lora32-v2116-case-for-meshtastic) or purchase from the creator's [Etsy Store](https://www.etsy.com/listing/1285837219/ttgo-lora-21-16-case).

#### Required Hardware

- (x4) M3x16mm socket-head cap screws
- (x4) M3 Nuts
- (x2) M2 Screws (to secure TTGO LoRa32 board to frame)
- (x1) LiPo battery pack (1,000mAh)
- (x1) Momentary micro push button for PRG (6x6x5mm)

<img src={Tropho} width="600" align="left" />
