<script lang="ts">
import N8nInputNumber from 'element-ui/lib/input-number';

N8nInputNumber.name = 'n8n-input-number'; // eslint-disable-line @typescript-eslint/no-unsafe-member-access

export default N8nInputNumber;
</script>
