---
id: exit
title: Exit code
sidebar_label: Exit code
---

## What

Displays the last exit code or that the last command failed based on the configuration.

## Sample Configuration

import Config from '@site/src/components/Config.js';

<Config data={{
  "type": "exit",
  "style": "diamond",
  "foreground": "#ffffff",
  "background": "#00897b",
  "background_templates": ["{{ if gt .Code 0 }}#e91e63{{ end }}"],
  "trailing_diamond": "\uE0B4",
  "template": "<#193549>\uE0B0</> \uE23A ",
  "properties": {
    "always_enabled": true
  }
}}/>

## Properties

| Name             | Type      | Description                                  |
| ---------------- | --------- | -------------------------------------------- |
| `always_enabled` | `boolean` | always show the status - defaults to `false` |

[colors]: /docs/configuration/colors

## Template ([info][templates])

:::note default template

```template
{{ if gt .Code 0 }}\uf00d {{ .Meaning }}{{ else }}\uf42e{{ end }}
```

:::

### Properties

| Name       | Type     | Description                                                                             |
| ---------- | -------- | --------------------------------------------------------------------------------------- |
| `.Code`    | `number` | the last known exit code                                                                |
| `.Meaning` | `string` | the textual meaning linked to exit code (if applicable, otherwise identical to `.Code`) |

[templates]: /docs/configuration/templates
