---
id: carbonintensity
title: Carbon Intensity
sidebar_label: Carbon Intensity
---

## What

Shows the actual and forecast carbon intensity in gCO2/kWh using data from the [Carbon Intensity API][carbonintensity-api].

:::note
Note that this segment only provides data for Great Britain at the moment. Support for other countries may become available in the future.
:::

## Sample Configuration

:::caution
The API can be slow. It's recommended to set the `http_timeout` property to a large value (e.g. `5000`).
:::

import Config from "@site/src/components/Config.js";

<Config
  data={{
    type: "carbonintensity",
    style: "powerline",
    powerline_symbol: "\uE0B0",
    foreground: "#000000",
    background: "#ffffff",
    background_templates: [
      '{{if eq "very low" .Index}}#a3e635{{end}}',
      '{{if eq "low" .Index}}#bef264{{end}}',
      '{{if eq "moderate" .Index}}#fbbf24{{end}}',
      '{{if eq "high" .Index}}#ef4444{{end}}',
      '{{if eq "very high" .Index}}#dc2626{{end}}',
    ],
    template:
      " CO₂ {{ .Index.Icon }}{{ .Actual.String }} {{ .TrendIcon }} {{ .Forecast.String }} ",
    properties: {
      http_timeout: 5000,
      cache_timeout: 10,
    },
  }}
/>

## Properties

| Name            | Type  | Default | Description                                                                                                                                      |
| --------------- | :---: | :-----: | ------------------------------------------------------------------------------------------------------------------------------------------------ |
| `http_timeout`  | `int` | `20`    | Timeout (in milliseconds) for HTTP requests. The default is 20ms, but you may need to set this to as high as 5000ms to handle slow API requests. |
| `cache_timeout` | `int` | `10`    | Timeout (in minutes) for the response cache. The default is 10m. A value of 0 disables the cache.                                                |

## Template ([info][templates])

:::note default template

```template
CO₂ {{ .Index.Icon }}{{ .Actual.String }} {{ .TrendIcon }} {{ .Forecast.String }}
```

:::

### Properties

| Name         | Type     | Description                                                                                                                                                             |
| ------------ | -------- | ----------------------------------------------------------------------------------------------------------------------------------------------------------------------- |
| `.Forecast`  | `Number` | The forecast carbon intensity in gCO2/kWh. Equal to `0` if no data is available.                                                                                        |
| `.Actual`    | `Number` | The actual carbon intensity in gCO2/kWh. Equal to `0` if no data is available.                                                                                          |
| `.Index`     | `Index`  | A rating of the current carbon intensity. Possible values are `"very low"`, `"low"`, `"moderate"`, `"high"`, or `"very high"`. Equal to `"??"` if no data is available. |
| `.TrendIcon` | `string` | An icon representation of the predicted trend in carbon intensity based on the Actual and Forecast values. Possible values are `"↗"`, `"↘"`, or `"→"`.                  |

#### Number

| Name      | Type     | Description                        |
| --------- | -------- | ---------------------------------- |
| `.String` | `string` | string representation of the value |

#### Index

| Name    | Type     | Description                      |
| ------- | -------- | -------------------------------- |
| `.Icon` | `string` | icon representation of the value |

[templates]: /docs/configuration/templates
[carbonintensity-api]: https://carbon-intensity.github.io/api-definitions
